<template>
    <VolumeMonitoringPage></VolumeMonitoringPage>
</template>

<script setup lang="ts">
import VolumeMonitoringPage from '~/components/monitorings/VolumeMonitoringPage.vue';
</script>

<style scoped>
.monitorings-page {
    display: grid;
    grid-template-columns: auto 1fr;
}
</style>