<template>
    <div class="monitorings-page">
        <MonitoringSidebar></MonitoringSidebar>
        <NuxtPage></NuxtPage>
    </div>
</template>

<script setup lang="ts">
import MonitoringSidebar from '~/components/MonitoringSidebar.vue';
</script>

<style scoped>
.monitorings-page {
    display: grid;
    grid-template-columns: auto 1fr;
}
.monitorings-page > * {
    padding: 1rem;
}
</style>